<!-- Footer -->
<br>
<p class="tli">Manfred Larcher - <a href="http://www.grufo.net" target="_new">http://www.grufo.net</a> - last change: <!-- /datede --></p>
<br>
<div align="center"><A href="http://sourceforge.net"> <IMG src="http://sourceforge.net/sflogo.php?group_id=60026&amp;type=5" width="210" height="62" border="0" alt="SourceForge Logo"></A> </div>
</body>
</html>
